11.5” x 17.5” Vertical Wall Poster Specifications
Applies to: WPT-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 17.75 x 11.75 in.
Elements touching cut line must extend to bleed.
Cut Line - 17.5 x 11.5 in. Final product cut size.
17 x 11 in.
Keep all critical text/images inside safe area.