Large Return Address Label Specifications
Applies to: RAL-CUS

ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Bleed Area - 3.025 x 1.375 in.
Elements touching cut line
must extend to bleed.
Cut Line - 2.9 x 1.25 in. Final product cut size.
Safe Zone - 2.65 x 1 in.
Keep all critical text/images
inside safe area.