Return Address Label Specifications
Applies to: RA-CUS

ALWAYS:
Use CMYK color values and color mode | Convert fonts to outline
Package fonts and links (for IDML) | Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Bleed Area - 2.975 x .895 in.
Elements touching cut line must extend to bleed.
Cut Line - 2.85 x .77 in. Final product cut size.
Safe Zone - 2.6825 x .5825 in.
Keep all critical text/images inside safe area.