5.75” x 5” Hexagon Magnet
Layout Specifications
Applies to: PM5750-CUS
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 5.25 x 6 in
Elements touching cut line must extend to bleed.
Cut Line - 5 x 5.75 in
Final product cut size.
Safe Area - 4.75” x VARIABLE (see other measurements)
Keep all critical text/images inside safe area.

Widest Safe Area - 5.5”
Keep all critical text/images inside safe area.

Narrow Safe Area - 2.75”
Keep all critical text/images inside safe area.