7.5” x 5.5” Picture Frame Magnet Horizontal Layout Specifications
Applies to: PM5575-CUSV

Bleed Area - 5.75 x 7.75 in.
Elements touching cut line must extend to bleed.
Cut Line - 5.5 x 7.5 in. Final product cut size.
Safe Area - 5.25 x 7.25 in.
Keep all critical text and images inside safe area.

Picture Frame Bleed Area - 3.875 x 5.875 in.
Elements touching cut line must extend to bleed.
Picture Frame Cut Line - 3.625 x 5.625 in. Final product cut size.
Picture Frame Safe Area - 3.375 x 5.375 in.
Keep all critical text and images inside safe area.

ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI

ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML