7.375” x 5” Horizontal Picture Frame
Magnet Layout Specifications
Applies to: PM5073-CUSH

ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI

ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Inner Picture Frame Cut Line - 2 x 2.75 in. Final product cut size.
Inner Picture Frame Safe Area - 1.75 x 2.5 in.
Keep all critical text and
images inside safe area.

Outer Picture Frame Cut Line - 2.875 x 3.5 in. Final product cut size.
Outer Picture Frame Safe Area - 2.25 x 3 in.
Keep all critical text and
images inside safe area.

Bleed Area - 7.625 x 5.25 in.
Elements touching cut line must extend to bleed.
Cut Line - 7.375 x 5 in. Final product cut size.
Safe Area - 7.125 x 4.75 in.
Keep all critical text and images inside safe area.