4.25” x 5.75” Vertical Layout Specifications
Applies to: MC4257-CUSV, P38M4257-CUSV and PM4257-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 4.4375 x 5.9375 in.
Elements touching cut line must extend to bleed.
Cut Line - 4.25 x 5.75 in. Final product cut size.
Safe Area - 4 x 5.5 in.
Keep all critical text and images inside safe area.