4.25” x 5.75” Horizontal Layout Specifications
Applies to: MC4257-CUSH, P38M4257-CUSH and PM4257-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 5.9375 x 4.4375 in.
Elements touching cut line must extend to bleed.
Cut Line - 5.75x 4.25 in. Final product cut size.
Safe Area - 5.5 x 4 in.
Keep all critical text and images inside safe area.