4” x 7” Vertical Layout Specifications
Applies to: PM4070-CUSV and FM4070-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 4.25 x 7 in.
Elements touching cut line must extend to bleed.
Cut Line - 4 x 7 in. Final product cut size.
3.75 x 6.75 in.
Keep all critical text/images inside safe area.