3.7” x 5.7” Layout Specifications
Applies to: PM3757-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 5.95 x 3.95 in.
Elements touching cut line must
extend to bleed.
Cut Line - 5.7 x 3.7 in. Final product cut size.
Safe Area - 5.45 x 3.45 in.
Keep all critical text
images inside safe area.