1.5” x 8.25” Vertical Full Magnet Layout Specifications
Applies to: PM1582-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 1.6875 x 8.4375 in.
Elements touching cut line
must extend to bleed.
Cut Line - 1.5 x 8.25 in. Final product cut size.
1.25 x 8 in.
Keep all critical text/images inside safe area.