2” x 5.5” Horizontal Magnetic Layout Specifications
Applies to: P38M2055-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Bleed Area - 5.75 x 2.75 in
Elements touching cut line must extend to bleed.
Cut Line - 5.5 x 2 in
Final product cut size.
Safe Area - 5.25 x 1.75 in
Keep all critical text/images inside safe area.