2” x 4.5” Vertical Layout Specifications
Applies to: P38M2045-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 2.25 x 4.75 in.
Elements touching cut line
must extend to bleed.
Cut Line - 2 x 4.5 in. Final product cut size.
1.75 x 4.25 in.
Keep all critical text/images
inside safe area.