8.5” x 11” Vertical Layout Specifications
Applies to: LE8511-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 8.75 x 11.25 in.
Elements touching cut line must extend to bleed.
Cut Line - 8.5 x 11 in. Final product cut size.
8.25 x 10.75 in.
Keep all critical text/images inside safe area.