Tri-Fold Brochure Layout Specifications
Applies to: LE8511-C-1, LE8511-C-2, LE8511-C-SMH & LE8511-C-SMV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 8.75 x 11.25 in
Elements touching cut line must extend to bleed.
Cut Line - 8.5 x 11 in
Final product cut size.

FOLD-IN PANEL
Panel Size - 3.625 x 8.5 in.
Safe Area - 3.375 x 8.25 in
Keep all critical text/images inside safe area.

BACK PANEL
Panel Size - 3.688 x 8.5 in.
Safe Area - 3.438 x 8.25 in
Keep all critical text/images inside safe area.

FRONT PANEL
Panel Size - 3.688 x 8.5 in.
Safe Area - 3.438 x 8.25 in
Keep all critical text/images inside safe area.

INSIDE LEFT PANEL
Panel Size - 3.688 x 8.5 in.
Safe Area - 3.438 x 8.25 in
Keep all critical text/images inside safe area.

INSIDE CENTER PANEL
Panel Size - 3.688 x 8.5 in.
Safe Area - 3.438 x 8.25 in
Keep all critical text/images inside safe area.

INSIDE RIGHT PANEL
Panel Size - 3.625 x 8.5 in.
Safe Area - 3.375 x 8.25 in
Keep all critical text/images inside safe area.