3.5” x 6” Vertical Layout Specifications
Applies to: II3560-CUSV & IC3560-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 3.62 x 6.12 in.
Elements touching cut line must extend to bleed.
Cut Line - 3.5 x 6 in. Final product cut size.
3.25 x 5.75 in.
Keep all critical text/images inside safe area.

Bleed Area - 3.75 x 6.25 in.

Cut Line - 3.5 X 6 in.

Safe Area - 3.25 x 5.75 in.

3.5” x 6” Vertical Layout Specifications
Applies to: II3560-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML