6” X 3.5” Horizontal Layout Specifications
Applies to: III3560-CUSH & IC3560-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 6.12 x 3.62 in.
Elements touching cut line must extend to bleed.
Cut Line - 3.5 x 6 in. Final product cut size.
3.25 x 5.75 in.
Keep all critical text/images inside safe area.