Bleed Area - 9 x 3.75 in.

Cut Line - 8.75 x 3.5 in.

Safe Area - 8.5 x 3.25 in.

Horizontal Slim Insert Layout Specifications
Applies to: IC3587-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Horizontal Slim Insert Layout Specifications
Applies to: IC3587-CUS
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 9 x 3.75 in.
Elements touching cut line must extend to bleed.
Cut Line - 3.5 x 8.75 in. Final product cut size.
8.5 x 3.25 in.
Keep all critical text/images inside safe area.