3.5” x 8.75” Horizontal Magnetic Card Layout Specifications
Applies to: FM3587-CUSHZ
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 3.75 x 9 in.
Elements touching cut line must extend to bleed.
Cut Line - 3.5 x 8.75 in. Final product cut size.
3.25 x 8.5 in.
Keep all critical text/images inside safe area.