3.3” x 5.6” Horizontal Layout Specifications
Applies to: PM3356-CUS
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 5.875 x 3.625 in.
Elements touching cut line must extend to bleed.
Cut Line - 5.625 x 3.375 in. Final product cut size.
5.375 x 3.125 in.
Keep all critical text/images inside safe area.