2.5” x 4”
Vertical
Oval Custom
Layout
Specifications
Applies to: FM2540-CUSV

ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Bleed Area - 2.75 x 4.25 in
Elements touching cut line must extend to bleed.
Cut Line - 2.5 x 4 in
Final product cut size.
Safe Area - 2.25 x 3.75 in
Keep all critical text/images inside safe area.