2” x 2” Printed Fridge Magnet
Applies to: FM2020 and BC2020
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 2.25 x 2.25 in
Elements touching cut line must extend to bleed.
Cut Line - 2 x 2 in
Final product cut size.
Safe Area - 1.75 x 1.75 in
Keep all critical text/images inside safe area.