3”x 5” Horizontal Magnet Layout Specifications
Applies to: FM0305-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 5.25 x 3.25 in.
Elements touching cut line must extend to bleed.
Cut Line - 5 x 3 in. Final product cut size.
4.75 x 2.75 in.
Keep all critical text/images inside safe area.