6”x 6” Square Magnet Layout Specifications
Applies to: CM0606-CUSS
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 6.25 x 6.25 in.
Elements touching cut line must extend to bleed.
Cut Line - 6 x 6 in. Final product cut size.
5.5 x 5.5 in.
Keep all critical text/images inside safe area.