Oval Layout Specifications
Applies to: CM0305-CUSO and FM0305-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

Bleed Area - 5.25 x 3.25 in
Elements touching cut line must extend to bleed.
Cut Line - 5 x 3 in
Final product cut size.
Safe Area - 4.75 x 2.75 in
Keep all critical text/images inside safe area.