36” x 92” Retractable Banner Specifications
Applies to: BANNER-3692SDR
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Cut Line - 36 x 92 in. Final product cut size.
Safe Zone - 34 x 88 in.
Keep all critical text/images inside safe area.
Must maintain 1” margin at the top and 3” margin at the bottom.