2.2” x 3.4” Vertical Layout Specifications
Applies to: APT2234-CUSV and FM2234-CUSV
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 3.5x 3.6875 in.
Elements touching cut line must extend to bleed.
Cut Line - 2.25 x 3.4375 in. Final product cut size.
2 x 3.1875 in.
Keep all critical text/images inside safe area.