2.2” x 3.4” Horizontal Layout Specifications
Applies to: APT2234-CUSH and FM2234-CUSH
ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML
Bleed Area - 3.6875 x 3.5 in.
Elements touching cut line must extend to bleed.
Cut Line - 3.4375 x 2.25 in. Final product cut size.
3.1875 x 2 in.
Keep all critical text/images inside safe area.