5.25” x 4” Horizontal Picture Frame Magnet
Applies to: 3MPF-FANCY-CUS
OUTSIDE Bleed Area - 5.5 x 4.25 in.
Elements touching cut line must extend to bleed.
OUTSIDE Cut Line - 5.25 x 4 in. Final product cut size.
OUTSIDE Safe Zone - 4.75 x 3.5 in.
Keep all critical text/images inside safe area.

ALWAYS:
Use CMYK color values and color mode
Convert fonts to outline
Package fonts and links (for IDML)
Make sure images are 300+ DPI
ACCEPTABLE FILE FORMATS:
PDF, EPS, AI, TIFF, PSD, JPG, PNG, IDML

INSIDE Cut Line - 3.5 x 2.25 in. Final product cut size.
INSIDE Safe Zone - 4.75 x 3.5 in.
Keep all critical text/images inside safe area.